<template>
  <NuxtLink to="/" class="mb-4 flex-grow self-start">
    <h1 class="text-4xl font-medium dark:text-neutral-200">
      <img
        src="/logo.png"
        width="32"
        class="dark:bg mr-2 inline align-middle"
      /><span class="align-middle">WireGuard</span>
    </h1>
  </NuxtLink>
</template>
